DROP DATABASE IF EXISTS d1;
DROP DATABASE IF EXISTS d2;
DROP DATABASE IF EXISTS d3;

CREATE DATABASE d1;
CREATE DATABASE d2;
CREATE DATABASE d3;

CREATE TABLE d1.t1 (
   i int
) ENGINE=MyISAM CHARSET=utf8;
INSERT INTO d1.t1 VALUES (1),(2),(3),(4),(5),(6),(7),(8),(9);
CREATE TABLE d1.t2 (
   c varchar(255)
) ENGINE=InnoDB;
CREATE TABLE d1.t3 (
   i int
) ENGINE=MEMORY;

CREATE TABLE d2.t1 (
   i int
);

-- d3 is an empty database.
